LoadOptions_SearchPaths: ${RfOut_DP}... ${NXCash_DP}... ${RfIn_DP}... C:\\ugs\\nx75\\UGII...
LoadOptions_LoadComponents: load_all_components
LoadOptions_LoadFully: YES
LoadOptions_UseLightweightRepresentations: NO
LoadOptions_LoadWAVE: NO
LoadOptions_LoadWAVEParents: NONE                                                                               d
LoadOptions_LoadSubstitution: dont_allow_substitution
LoadOptions_LoadLatest: NO
LoadOptions_LoadOption: load_from_search_dirs
LoadOptions_LoadFilters: load_no_components
LoadOptions_LoadFailOption: dont_abort
LoadOptions_ReferenceSets: "As Saved" "Entire Part" "Empty" "Use Model"
LoadOptions_ApplyAllLevels: NO
LoadOptions_GenerateMissingPFM: YES
LoadOptions_BookmarkRefSets: Import
LoadOptions_BookmarkPartsLoad: Load_Visible
LoadOptions_BookmarkRestoreFullyLoadedState: no
