LoadOptions_SearchPaths: D:\\Daten_CAD_02\\AS\\ D:\\Daten_CAD_02\\BS\\ D:\\Daten_CAD_02\\CS\\ D:\\Daten_CAD_02\\A\\ D:\\Daten_CAD_02\\B\\ D:\\Daten_CAD_02\\C\\ D:\\Daten_CAD_02\\D\\ D:\\Daten_CAD_02\\E\\ D:\\Daten_CAD_02\\I\\ D:\\Daten_CAD_02\\ugarchiv01\\ D:\\Daten_CAD_02\\ugarchiv02\\ D:\\Daten_CAD_02\\ugarchiv03\\ D:\\Daten_CAD_02\\ugarchiv04\\ D:\\Daten_CAD_02\\ugarchiv05\\ D:\\Daten_CAD_02\\ugarchiv06\\ 
LoadOptions_LoadComponents: load_all_components
LoadOptions_LoadFully: YES
LoadOptions_LoadWAVE: NO
LoadOptions_LoadWAVEParents: NONE
LoadOptions_LoadSubstitution: dont_allow_substitution
LoadOptions_LoadLatest: NO
LoadOptions_LoadOption: load_from_search_dirs
LoadOptions_LoadFilters: load_no_components
LoadOptions_LoadFailOption: dont_abort
LoadOptions_ReferenceSets: "As Saved" "Entire Part" "Empty" "Use Model" 
LoadOptions_ApplyAllLevels: NO
LoadOptions_GenerateMissingPFM: NO
LoadOptions_UseLightweightRepresentations: NO
LoadOptions_ManagedModeLoadOption: load_by_revision_rule
LoadOptions_BookmarkRefSets: Import
LoadOptions_BookmarkPartsLoad: Load_Visible
LoadOptions_BookmarkRestoreFullyLoadedState: no
LoadOptions_SubsetLoadBehavior: Do_Not_Update
LoadOptions_PartLoadOption: partially_load
